---
title: Re-run tests multiple times with the Bun test runner
sidebarTitle: Re-run tests
mode: center
---

Use the `--rerun-each` flag to re-run every test multiple times with the Bun test runner. This is useful for finding flaky or non-deterministic tests.

```sh terminal icon="terminal"
# re-run each test 10 times
bun test --rerun-each 10
```

---

See [Docs > Test runner](/test) for complete documentation of `bun test`.
